______________________________________________________________________
FX Menu Help
~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~
The Main FX Menu can be displayed anytime by pressing F2 (If you save
FX.MAC to RIPTERM.MAC) or you can define the keystroke you prefer using
the Keystroke Macro Editor <alt-K> and the command $>fxmenu.rip$ ... 
in fact you can display any RIP, Text, or ANSI using the $>filename$
command as a macro.

FX BBS Menus are General Commands that are common to many BBSs and may
not always match the options of a specific BBS, however the First letter
of the buttons is the command that is transmitted. If the command is not
available as a button simply use your keyboard as normal... (duh).

Some Screens will have Graphics that draw up in the text window... this 
is just for fun since the BBS graphics will quickly draw over them. Or you
can clear them using the clear text button or <alt-T> then hit Enter or
the BBS command to redisplay Graphics. If you don't like this use one of 
the Menus without graphics in the Text Window or a Full Ansi Screen.

Some Screens will "auto-toggle" the Status Bar.
To redisplay the Status Bar simply press <alt-T>.
